<template>
  <v-sheet class="mt-2" color="transparent">
    <h5 class="text-h5">Buildserver Stats</h5>
    <iframe
      :height="width <= 800 ? '1050px' : '420px'"
      allowtransparency="true"
      class="w-100 border-0"
      src="https://stats.itsh.dev/public-dashboards/0fb04abb0c5e4b7390cf26a98e6dead1"></iframe>
  </v-sheet>
</template>

<script lang="ts" setup>
import { useDisplay } from 'vuetify'

const { width } = useDisplay()
</script>
